Figure 1: Locations of earthquakes (a) and stations (b) locations.

Figure 2: The number of seismic paths before (thick lines) and after (thin lines) the cluster analysis.

Figure 3: Average path length (a) and average measurement uncertainties (standard deviation) (b).

Figure 4:

Figure 5:

Figure 6: Three examples of resolution technique .

Figure 7:

Figure 8:

Figure 9:

Figure 10:

Figure 11:

Figure 12:

Figure 13:

Figure 14:

Figure 15:

Figure 16:

Figure 17:

Figure 18:

Figure 19: